import { redirect } from 'next/navigation';

/**
 * Root page — always redirects to /login.
 *
 * Authentication state is checked client-side by the login page itself
 * (if already authenticated, it can redirect to /overview).
 * Using a server-side redirect here avoids the black-screen flash that
 * occurs when the root page renders null and waits for client JS.
 */
export default function RootPage() {
  redirect('/login');
}
